0 . 4 0 . 6 0 . 8 1 . 0 1 . 2 1 . 4 1 . 0 1 . 5 2 . 0 2 . 5

Normalized ReflectivityWavelength [mm]1999 DE9Mauna Kea Cinder + Water IceFigure 18